ನ್ಯಾಷನಲ್ ಹೆರಾಲ್ಡ್ ಕಚೇರಿ ಸೇರಿ 12 ಕಡೆ ಇಡಿ ದಾಳಿ – ಕಾಂಗ್ರೆಸ್‌ ಕಾರ್ಯಕರ್ತರಿಂದ ಪ್ರತಿಭಟನೆ

ನವದೆಹಲಿ: ಅಕ್ರಮ ಹಣ ವರ್ಗಾವಣೆ ಪ್ರಕರಣಕ್ಕೆ ಸಂಬಂಧಿಸಿದಂತೆ ನ್ಯಾಷನಲ್‌ ಹೆರಾಲ್ಡ್‌ ಕಚೇರಿ ಸೇರಿದಂತೆ 12 ಕಡೆಗಳಲ್ಲಿ ಜಾರಿ ನಿರ್ದೇಶನಾಲಯ (ಇ.ಡಿ) ದಾಳಿ ನಡೆಸಿದೆ.

ನ್ಯಾಷನಲ್‌ ಹೆರಾಲ್ಡ್‌ ಪ್ರಕರಣದಲ್ಲಿ ಈಗಾಗಲೇ ಕಾಂಗ್ರೆಸ್‌ ನಾಯಕರಾದ ರಾಹುಲ್‌ ಗಾಂಧಿ ಮತ್ತು ಸೋನಿಯಾ ಗಾಂಧಿ ಅವರನ್ನು ಇಡಿ ವಿಚಾರಣೆಗೆ ಒಳಪಡಿಸಿತ್ತು. ಇದಾದ ಬಳಿಕ ನ್ಯಾಷನಲ್‌ ಹೆರಾಲ್ಡ್‌ ಕಚೇರಿ ಸೇರಿ ಹಲವೆಡೆ ದಾಳಿ ಮಾಡಿ ಪರಿಶೀಲನೆ ನಡೆಸಿದೆ. ಇದನ್ನೂ ಓದಿ: ಅಕ್ರಮ ಹಣ ವರ್ಗಾವಣೆ ಪ್ರಕರಣ – ಡಿ.ಕೆ ಶಿವಕುಮಾರ್‌ಗೆ ಬಿಗ್ ರಿಲೀಫ್

ಹೆರಾಲ್ಡ್ ಹೌಸ್‌ನ 4ನೇ ಮಹಡಿಯಲ್ಲಿ ಇಡಿ ದಾಳಿ ನಡೆಸಿತ್ತು. ಇಲ್ಲಿಯೇ ನ್ಯಾಷನಲ್ ಹೆರಾಲ್ಡ್‌ನ ಪ್ರಕಾಶನ ಕಚೇರಿ ಇದೆ. ಇಡಿ ಅಧಿಕಾರಿಗಳು ಇಂದು ಬೆಳಗ್ಗೆ 10 ಗಂಟೆ ಸುಮಾರಿಗೆ ದಾಳಿ ನಡೆಸಿದ್ದರು.

ಅಕ್ರಮ ಹಣ ವರ್ಗಾವಣೆ ಪ್ರಕರಣದಲ್ಲಿ ದೆಹಲಿಯಲ್ಲಿರುವ ಕಾಂಗ್ರೆಸ್ ಒಡೆತನದ ನ್ಯಾಷನಲ್ ಹೆರಾಲ್ಡ್ ಪತ್ರಿಕೆಯ ಕಚೇರಿ ಸೇರಿದಂತೆ 12 ಸ್ಥಳಗಳಲ್ಲಿ ಇಡಿ ದಾಳಿ ನಡೆಸಿದೆ. ಕೋಲ್ಕತ್ತಾದ ಕೆಲವು ಸ್ಥಳಗಳ ಮೇಲೆ ತನಿಖಾ ಸಂಸ್ಥೆ ದಾಳಿ ನಡೆಸಬಹುದು ಎಂದು ಮೂಲಗಳು ತಿಳಿಸಿವೆ. ಇದನ್ನೂ ಓದಿ: ಮನೆಯಲ್ಲಿ ಸಿಕ್ಕಿದ ಹಣ ನನಗೆ ಸೇರಿದ್ದಲ್ಲ, ಯಾರೋ ಅಲ್ಲಿ ಇಟ್ಟಿದ್ದಾರೆ: ಅರ್ಪಿತಾ ಮುಖರ್ಜಿ

ಹೆರಾಲ್ಡ್‌ ಕಚೇರಿ ಮೇಲೆ ಇಡಿ ದಾಳಿ ಮಾಡುತ್ತಿದ್ದಂತೆ ಅದನ್ನು ವಿರೋಧಿಸಿ ಕಾಂಗ್ರೆಸ್‌ ಕಾರ್ಯಕರ್ತರು ಪ್ರತಿಭಟನೆ ನಡೆಸಿದರು. ಕಚೇರಿ ಹೊರಗೆ ಅಪಾರ ಸಂಖ್ಯೆಯಲ್ಲಿ ಸೇರಿದ ಕಾಂಗ್ರೆಸ್‌ ಕಾರ್ಯಕರ್ತರು ಸರ್ಕಾರದ ವಿರುದ್ಧ ಘೋಷಣೆ ಕೂಗಿದರು.

Live Tv
[brid partner=56869869 player=32851 video=960834 autoplay=true]