ಕಾಶ್ಮೀರಿ ಪಂಡಿತರಿಗೆ ಭದ್ರತೆ ಒದಗಿಸುವಲ್ಲಿ ಕೇಂದ್ರ ಸರ್ಕಾರ ವಿಫಲವಾಗಿದೆ: ಓವೈಸಿ

ನವದೆಹಲಿ: ಜಮ್ಮುವಿನ ಶೋಪಿಯಾನ್‌ ಜಿಲ್ಲೆಯಲ್ಲಿ ಭಯೋತ್ಪಾದಕರ ಗುಂಡಿಗೆ ಕಾಶ್ಮೀರಿ ಪಂಡಿತನ ಹತ್ಯೆಗೆ ಎಐಎಂಐಎಂ ಮುಖ್ಯಸ್ಥ ಹಾಗೂ ಸಂಸದ ಅಸಾದುದ್ದೀನ್‌ ಓವೈಸಿ ಬೇಸರ ವ್ಯಕ್ತಪಡಿಸಿದ್ದಾರೆ. ಕಾಶ್ಮೀರಿ ಪಂಡಿತರನ್ನು ರಕ್ಷಿಸುವಲ್ಲಿ ಕೇಂದ್ರ ಸರ್ಕಾರ ವಿಫಲವಾಗಿದೆ ಎಂದು ಕಿಡಿಕಾರಿದ್ದಾರೆ.

ಕೇಂದ್ರ ಮತ್ತು ಲೆಫ್ಟಿನೆಂಟ್ ಗವರ್ನರ್ ಮನೋಜ್ ಸಿನ್ಹಾ ವಿರುದ್ಧ ತೀವ್ರ ವಾಗ್ದಾಳಿ ನಡೆಸಿರುವ ಓವೈಸಿ, ಕಾಶ್ಮೀರದಲ್ಲಿ ನಡೆದ ಘಟನೆ ನರೇಂದ್ರ ಮೋದಿ ಸರ್ಕಾರದ ವೈಫಲ್ಯಕ್ಕೆ ಮತ್ತೊಂದು ಉದಾಹರಣೆ ಎಂದು ತಿಳಿಸಿದ್ದಾರೆ. ಇದನ್ನೂ ಓದಿ: ಕಾಶ್ಮೀರದಲ್ಲಿ ಮತ್ತೆ ಪಂಡಿತರು ಟಾರ್ಗೆಟ್ – ಓರ್ವನ ಹತ್ಯೆ, ಮತ್ತೋರ್ವ ಗಂಭೀರ

ಕಾಶ್ಮೀರಿ ಪಂಡಿತರಿಗೆ ಭದ್ರತೆ ಒದಗಿಸಲು ಕೇಂದ್ರ ವಿಫಲವಾಗಿದೆ. ಹೀಗಾಗಿ ಅವರು ಹೆಚ್ಚಿನ ಹಿಂಸಾಚಾರಕ್ಕೆ ಹೆದರಿ ಕಣಿವೆಯನ್ನು ತೊರೆಯಲು ಬಯಸುತ್ತಿದ್ದಾರೆ ಎಂದು ಹೇಳಿದ್ದಾರೆ.

ಬಿಜೆಪಿ, ಜಮ್ಮು ಮತ್ತು ಕಾಶ್ಮೀರದಲ್ಲಿ ಲೆಫ್ಟಿನೆಂಟ್‌ ಗವರ್ನರ್‌ ನೇಮಿಸಿತು. ಈಗ ಅಲ್ಲಿ ಕೇಂದ್ರ ಸರ್ಕಾರ ವಿಫಲವಾಗಿದೆ. ಜಮ್ಮು ಮತ್ತು ಕಾಶ್ಮೀರಕ್ಕೆ ವಿಶೇಷ ಸ್ಥಾನಮಾನ ನೀಡುವ 370ನೇ ವಿಧಿ ರದ್ದು ಮಾಡಿದ್ದು ಕೂಡ ಸಹಾಯ ಮಾಡಲಿಲ್ಲ. ಇಲ್ಲಿ ಕಾಶ್ಮೀರಿ ಪಂಡಿತರ ಮೇಲೆ ನಡೆದ ಮೊದಲ ದಾಳಿ ಇದಲ್ಲ. ಅವರಿಗೆ ಭದ್ರತೆ ನೀಡುವಲ್ಲಿ ಕೇಂದ್ರ ವಿಫಲವಾಗಿದ್ದು, ಕಾಶ್ಮೀರಿ ಪಂಡಿತರು ಈಗ ಕಾಶ್ಮೀರವನ್ನು ತೊರೆಯಲು ಬಯಸುತ್ತಿದ್ದಾರೆ ಎಂದು ಮಾತನಾಡಿದ್ದಾರೆ. ಇದನ್ನೂ ಓದಿ: ಜಿಯೋ ಬಿಡುಗಡೆ ಮಾಡಲಿದೆ ಕಡಿಮೆ ಬೆಲೆಯ 5G ಫೋನ್‌ – ಬೆಲೆ ಎಷ್ಟು? ಗುಣ ವೈಶಿಷ್ಟ್ಯಗಳು ಏನು?

Live Tv
[brid partner=56869869 player=32851 video=960834 autoplay=true]